Table 1: Some physical parameters of non-rotating and rotating intermediate mass stars

M/Mfi ZAMS time R/Rfi L/Lfi logT_e T_c ρ_c r_{c,rad} (M_r/M)_c W_c W_s (10^6 yr) (10^7 K) (g/cm^3) (10�^4s�^1) (10�^4s�^1)

2 21.7 1.65 16.7 3.96 2.08 59.6 1.06 0.139 - - 2 25.1 1.85 13.9 3.92 2.07 65.3 1.23 0.113 8.89 2.11 2 23.9 1.57 11.8 3.94 2.00 68.0 - 0.160 7.36 2.58 3 7.68 2.00 85.3 4.10 2.39 38.3 1.52 0.185 - - 3 10.9 2.40 61.9 4.02 2.36 42.2 1.44 0.175 7.15 1.95 3 9.58 2.04 49.3 4.03 2.29 46.1 - 0.180 7.88 2.49 4 3.43 2.37 253 4.18 2.56 26.0 1.65 0.212 - - 4 5.35 2.78 196 4.12 2.52 27.8 1.60 0.209 5.20 1.75 4 5.16 2.35 149 4.12 2.49 32.0 - 0.220 6.17 2.29 5 1.85 2.71 572 4.24 2.68 19.1 1.70 0.233 - - 5 2.59 3.32 380 4.15 2.66 22.4 1.62 0.217 6.00 1.55 5 2.55 2.84 281 4.15 2.60 25.3 - 0.220 6.78 1.97 7 0.83 3.20 1860 4.33 2.94 13.4 1.75 0.260 - - 7 1.25 4.03 1290 4.24 2.89 14.8 1.65 0.250 4.66 1.37 7 1.08 3.30 1100 4.27 2.84 15.7 - 0.230 3.94 1.68 1